-- 007_clickhouse.down.sql
-- Reverse M7. Drops the archive database and everything in it.
-- This is destructive — archive rows are lost. The M7
-- archiver's next run will recreate the schema (it has
-- CREATE IF NOT EXISTS in its init path).

DROP DATABASE IF EXISTS ba_archive;
